/*
 * Copyright (C) 2012 Mozilla Foundation
 *
 * Licensed under the Apache License, Version 2.0 (the "License");
 * you may not use this file except in compliance with the License.
 * You may obtain a copy of the License at
 *
 *      http://www.apache.org/licenses/LICENSE-2.0
 *
 * Unless required by applicable law or agreed to in writing, software
 * distributed under the License is distributed on an "AS IS" BASIS,
 * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 * See the License for the specific language governing permissions and
 * limitations under the License.
 */

/**
 * DO NOT PUT RE-INCLUSION GUARD MACROS AROUND THIS HEADER!!!
 */

DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_LOW,   "low")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_HIGH,  "high")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_QCIF,  "qcif")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_CIF,   "cif")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_480P,  "480p")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_720P,  "720p")
DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_1080P, "1080p")
/**
 * This profile is disabled because the CAMCORDER_QUALITY_QVGA value
 * conflicts across AOSP and vendor-specific versions of MediaProfiles.h.
 *
 * See bug 804359.
 */
// DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_QVGA,  "qvga")
/**
 * The following profiles do not appear in the AOSP version of
 * MediaProfiles.h and are disabled.
 *
 * See bug 804359.
 */
// DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_FWVGA, "fwvga")
// DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_WVGA,  "wvga")
// DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_VGA,   "vga")
// DEF_GONK_RECORDER_PROFILE(CAMCORDER_QUALITY_WQVGA, "wqvga")
#undef DEF_GONK_RECORDER_PROFILE
