---
sidebar_position: 3
id: "config"
title: "Configuration"
---

Wave's configuration files are located at `~/.waveterm/config/`.

The main configuration file is `settings.json` (`~/.waveterm/config/settings.json`).

The file is structured as a mostly flat JSON file.  Instead of using sub-objects we prefer to
use ":" as level separators.

| Key Name | Type | Function |
|----------|------|----------|
| ai:baseurl | string | Set the AI Base Url (must be OpenAI compatible) |
| ai:apitoken | string | your AI api token |
| ai:name | string | string to display in the Wave AI block header |
| ai:model | string | model name to pass to API |
| ai:maxtokens | int | max tokens to pass to API |
| ai:timeoutms | int | timeout (in milliseconds) for AI calls |
| term:fontsize | float | the fontsize for the terminal block |
| term:fontfamily | string | font family to use for terminal block |
| term:disablewebgl | bool | set to false to disable WebGL acceleration in terminal |
| editor:minimapenabled | bool | set to false to disable editor minimap |
| editor:stickscrollenabled | bool | |
| web:openlinksinternally | bool | set to false to open web links in external browser |
| web:defaulturl | string | default web page to open in the web widget when no url is provided (homepage) |
| web:defaultsearch | string | search template for web searches.  e.g. `https://www.google.com/search?q={query}`.  "\{query}" gets replaced by search term |
| blockheader:showblockids | bool | show first 8 chars of blockid in the header |
| autoupdate:enabled | bool | enable/disable checking for updates |
| autoupdate:intervalms | float64 | time in milliseconds to wait between update checks |
| autoupdate:installonquit | bool | whether to automatically install updates on quit |
| autoupdate:channel | string | the auto update channel |
| widget:showhelp | bool | whether to show help/tips widgets in right sidebar |
| window:transparent | bool | set to true to enable window transparency (on platform where it is supported) |
| window:blur | bool | set to enable window background blurring |
| window:opacity | float64 | 0-1, window opacity |
| window:bgcolor | string | set the window background color (should be hex: #xxxxxx) |
| window:reducemotion | bool | set to true to disable most animations |
| window:tilegapsize | int | set to change override default gap between blocks |
| telemetry:enabled | bool | set to enable/disable telemetry |

For reference this is the current default configuration (v0.8.0):

```json
{
    "ai:model": "gpt-4o-mini",
    "ai:maxtokens": 1000,
    "ai:timeoutms": 10000,
    "autoupdate:enabled": true,
    "autoupdate:installonquit": true,
    "autoupdate:intervalms": 3600000,
    "editor:minimapenabled": true,
    "web:defaulturl": "https://github.com/wavetermdev/waveterm",
    "web:defaultsearch": "https://www.google.com/search?q={query}",
    "window:tilegapsize": 3,
    "telemetry:enabled": true
}
```
