# hiposter

```mdx-code-block
<p style={{ "text-align": "center" }}>
  <img src={require("@site/static/img/showcase/hiposter.webp").default} />
  <br />
</p>
```

[hiposter](https://github.com/obity/hiposter) is a simple and efficient http API testing client tool. Based on Wails, Go and sveltejs.