--  Note: if you would like to build and prove the same configurations, 
--  you have to use the same options used in the prove.gpr file  
--  in the form of "-gnateDOPTION=VALUE" compiler switches

--  Number of sockets that can be opened simultaneously
SOCKET_MAX_COUNT := 10

--  Default buffer size for reception
TCP_DEFAULT_RX_BUFFER_SIZE := 2860

--  Default buffer size for transmission
TCP_DEFAULT_TX_BUFFER_SIZE := 2860

--  Default SYN queue size for listening sockets
TCP_DEFAULT_SYN_QUEUE_SIZE := 4

--  UDP support
UDP_SUPPORT := True

TCP_SUPPORT := True
